PAPER TITLE CENTERED ON THE FIRST PAGE

First Name and SECOND NAME

Authors’ Affiliation Authors’ Address Centered on the First Page Phone: � � � ? Fax: � � � ? E-mail: � � �

Template Actual Size

Top Margin: 32 mm

Bottom Margin: 25 mm

Intercolumn Space: 6 mm

Page i of n marked by an erasable pencil here

Left Margin 15 mm

Right Margin 15 mm

The second and the following pages should begin here

ABSTRACT

The abstract and the following text of the first page should begin here

The text of the second column of the first page should begin here

Textheight: 240 mm The first page headerheight: 50 mm

(or larger in case of more authors from different institutions)

Textwidth: 180 mm

Columnwidth: 87 mm Columnwidth: 87 mm